From 56ace784652dc12f33b72113cb3a5a4149973c7b Mon Sep 17 00:00:00 2001
From: Georg Brandl <georg@python.org>
Date: Sun, 22 Jan 2006 19:38:05 +0000
Subject: typo

---
 Doc/lib/libtime.tex | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

diff --git a/Doc/lib/libtime.tex b/Doc/lib/libtime.tex
index bd35ed9..8045a63 100644
--- a/Doc/lib/libtime.tex
+++ b/Doc/lib/libtime.tex
@@ -225,7 +225,8 @@ used.  \var{format} must be a string.  \exception{ValueError} is raised
 if any field in \var{t} is outside of the allowed range.
 \versionchanged[Allowed \var{t} to be omitted]{2.1}
 \versionchanged[\exception{ValueError} raised if a field in \var{t} is
-out of range.]{2.4}
+out of range]{2.4}
+
 
 The following directives can be embedded in the \var{format} string.
 They are shown without the optional field width and precision
-- 
cgit v0.12

