From 53e5b71bbcaad150b21dad00bf2d15653b8edb13 Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Fri, 25 Apr 2003 15:27:33 +0000
Subject: Add modified versions of the examples from Sean Reifschneider (SF
 patch #545480).

---
 Doc/lib/liburllib2.tex | 36 ++++++++++++++++++++++++++++++++++++
 1 file changed, 36 insertions(+)

diff --git a/Doc/lib/liburllib2.tex b/Doc/lib/liburllib2.tex
index 9f279df..7b47f9b 100644
--- a/Doc/lib/liburllib2.tex
+++ b/Doc/lib/liburllib2.tex
@@ -601,3 +601,39 @@ Open the gopher resource indicated by \var{req}.
 \begin{methoddesc}[UnknownHandler]{unknown_open}{}
 Raise a \exception{URLError} exception.
 \end{methoddesc}
+
+
+\subsection{Examples \label{urllib2-examples}}
+
+This example gets the python.org main page and displays the first 100
+bytes of it:
+
+\begin{verbatim}
+>>> import urllib2
+>>> f = urllib2.urlopen('http://www.python.org/')
+>>> print f.read(100)
+<!DOCTYPE html PUBLIC "-//W3C//DTD HTML 4.01 Transitional//EN">
+<?xml-stylesheet href="./css/ht2html
+\end{verbatim}
+
+Here we are sending a data-stream to the stdin of a CGI and reading
+the data it returns to us:
+
+\begin{verbatim}
+>>> import urllib2
+>>> req = urllib2.Request(url='https://localhost/cgi-bin/test.cgi',
+...                       data='This data is passed to stdin of the CGI')
+>>> f = urllib2.urlopen(req)
+>>> print f.read()
+Got Data: "This data is passed to stdin of the CGI"
+\end{verbatim}
+
+The code for the sample CGI used in the above example is:
+
+\begin{verbatim}
+#!/usr/bin/env python
+import sys
+data = sys.stdin.read()
+print 'Content-type: text-plain\n\nGot Data: "%s"' %
+data
+\end{verbatim}
-- 
cgit v0.12

