From 6ed122a334c111bbeb0f8016fe5f9b14cd44aac9 Mon Sep 17 00:00:00 2001
From: Guido van Rossum <guido@python.org>
Date: Wed, 21 Apr 1999 16:19:16 +0000
Subject: Important fix mentioned by The Dragon De Monsyne: the sendmail()
 method does _not_ disconnect the connection when it throws a SMTPHeloError!

---
 Doc/lib/libsmtplib.tex | 3 +--
 1 file changed, 1 insertion(+), 2 deletions(-)

diff --git a/Doc/lib/libsmtplib.tex b/Doc/lib/libsmtplib.tex
index 2699cc7..d7f0147 100644
--- a/Doc/lib/libsmtplib.tex
+++ b/Doc/lib/libsmtplib.tex
@@ -144,8 +144,7 @@ when at least one recipient was accepted).
 \item \exception{SMTPHeloError}
 
 The server didn't reply properly to
-the helo greeting.  The connection has
-been closed.
+the helo greeting.
 
 \item \exception{SMTPSenderRefused}
 
-- 
cgit v0.12

