From 62a7f63a2467ed993d2de4ed3eae6e96d0e72e62 Mon Sep 17 00:00:00 2001
From: Neal Norwitz <nnorwitz@gmail.com>
Date: Fri, 7 Jun 2002 12:36:44 +0000
Subject: Fix typo

---
 Doc/lib/libsocket.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/Doc/lib/libsocket.tex b/Doc/lib/libsocket.tex
index 1c1885b..3024fa3 100644
--- a/Doc/lib/libsocket.tex
+++ b/Doc/lib/libsocket.tex
@@ -518,7 +518,7 @@ block until they can proceed.
 \begin{methoddesc}[socket]{settimeout}{value}
 Set a timeout on blocking socket operations. Value can be a
 nonnegative float expressing seconds, or \code{None}.  If a float is
-give, subsequent socket operations will raise an \exception{error}
+given, subsequent socket operations will raise an \exception{error}
 exception if the timeout period \var{value} has elapsed before the
 operation has completed.  Setting a timeout of \code{None} disables
 timeouts on socket operations.
-- 
cgit v0.12

