From 66f09613865e195cb35c4bd498f38c3f73fc7cfe Mon Sep 17 00:00:00 2001
From: Tim Peters <tim.peters@gmail.com>
Date: Fri, 23 Mar 2001 20:21:29 +0000
Subject: pydoc changed overnight in such a way that it no longer worked from
 the Windows start-menu item.  This recovers from that.

---
 PCbuild/python20.wse | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

diff --git a/PCbuild/python20.wse b/PCbuild/python20.wse
index fc5bd73..437771d 100644
--- a/PCbuild/python20.wse
+++ b/PCbuild/python20.wse
@@ -957,8 +957,8 @@ item: Install File
   Flags=0000000000000010
 end
 item: Install File
-  Source=%_SRC_%\Tools\scripts\pydoc
-  Destination=%MAINDIR%\pydoc.pyw
+  Source=%_SRC_%\Tools\scripts\*.pyw
+  Destination=%MAINDIR%\Tools\Scripts
   Description=Utility Scripts
   Flags=0000000000000010
 end
@@ -1366,7 +1366,7 @@ end
 item: Create Shortcut
   Source=%MAINDIR%\pythonw.exe
   Destination=%GROUP%\Module Docs.lnk
-  Command Options=%MAINDIR%\pydoc.pyw
+  Command Options=%MAINDIR%\Tools\Scripts\pydoc.pyw
   Working Directory=%MAINDIR%
   Key Type=1536
   Flags=00000001
-- 
cgit v0.12

