From 014d29f33114e3cef49c247d2b5035d4e63763d3 Mon Sep 17 00:00:00 2001
From: Georg Brandl <georg@python.org>
Date: Sat, 1 Apr 2006 07:42:41 +0000
Subject: Patch #1462496: typo in libsignal.tex

---
 Doc/lib/libsignal.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/Doc/lib/libsignal.tex b/Doc/lib/libsignal.tex
index f168b6d..cfdb4dd 100644
--- a/Doc/lib/libsignal.tex
+++ b/Doc/lib/libsignal.tex
@@ -100,7 +100,7 @@ The \module{signal} module defines the following functions:
   Any previously scheduled alarm is canceled (only one alarm can
   be scheduled at any time).  The returned value is then the number of
   seconds before any previously set alarm was to have been delivered.
-  If \var{time} is zero, no alarm id scheduled, and any scheduled
+  If \var{time} is zero, no alarm is scheduled, and any scheduled
   alarm is canceled.  The return value is the number of seconds
   remaining before a previously scheduled alarm.  If the return value
   is zero, no alarm is currently scheduled.  (See the \UNIX{} man page
-- 
cgit v0.12

