From 3ff7317857f505cdba6df00a5b443e917a86b1b4 Mon Sep 17 00:00:00 2001
From: Guido van Rossum <guido@python.org>
Date: Mon, 3 Mar 1997 16:02:32 +0000
Subject: Correct two typos

---
 Doc/lib/libaudioop.tex | 2 +-
 Doc/libaudioop.tex     | 2 +-
 2 files changed, 2 insertions(+), 2 deletions(-)

diff --git a/Doc/lib/libaudioop.tex b/Doc/lib/libaudioop.tex
index 13a82b3..40ef0f4 100644
--- a/Doc/lib/libaudioop.tex
+++ b/Doc/lib/libaudioop.tex
@@ -153,7 +153,7 @@ Convert the frame rate of the input fragment.
 converter returns a tupl \code{(\var{newfragment}, \var{newstate})},
 and \var{newstate} should be passed to the next call of ratecv.
 
-The \code{weightA} and \coden{weightB} arguments are parameters for a
+The \code{weightA} and \code{weightB} arguments are parameters for a
 simple digital filter and default to 1 and 0 respectively.
 \end{funcdesc}
 
diff --git a/Doc/libaudioop.tex b/Doc/libaudioop.tex
index 13a82b3..40ef0f4 100644
--- a/Doc/libaudioop.tex
+++ b/Doc/libaudioop.tex
@@ -153,7 +153,7 @@ Convert the frame rate of the input fragment.
 converter returns a tupl \code{(\var{newfragment}, \var{newstate})},
 and \var{newstate} should be passed to the next call of ratecv.
 
-The \code{weightA} and \coden{weightB} arguments are parameters for a
+The \code{weightA} and \code{weightB} arguments are parameters for a
 simple digital filter and default to 1 and 0 respectively.
 \end{funcdesc}
 
-- 
cgit v0.12

