From 4bffb8b3b51e6111d62ec852ee7ebf179be9c9ad Mon Sep 17 00:00:00 2001
From: Jack Jansen <jack.jansen@cwi.nl>
Date: Wed, 10 Apr 1996 14:56:32 +0000
Subject: Added warning on memory use of tcl/tk

---
 Mac/ReadMeOrSuffer | 6 ++++--
 1 file changed, 4 insertions(+), 2 deletions(-)

diff --git a/Mac/ReadMeOrSuffer b/Mac/ReadMeOrSuffer
index 3e5589a..ac390d0 100644
--- a/Mac/ReadMeOrSuffer
+++ b/Mac/ReadMeOrSuffer
@@ -22,8 +22,10 @@ compatability calls yourself and send me the results.
 If you don't have enough memory: the sizes choosen are somewhat arbitrary.
 Try lowering them and seeing whether the resulting python is still usable.
 Note, however, that python running out of memory may result in your mac
-freezing. I don't fully understand yet why the mac freezes instead of doing
-something a little less drastic.
+freezing. If this happens I would like to hear of it.
+
+Note that if you're using Tk you might want to raise the memory size, tcl
+and tk are quite a memory hog.
 
 PowerPC Macintosh instructions
 ------------------------------
-- 
cgit v0.12

