From 1fe3b82371c0d53b829a98ce497f06782a616315 Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Thu, 14 Sep 2000 18:25:41 +0000
Subject: Avoid reference to specific versions of Python where possible. This
 partially addresses SourceForge bug #114318.

---
 Doc/lib/libsite.tex | 8 ++++----
 1 file changed, 4 insertions(+), 4 deletions(-)

diff --git a/Doc/lib/libsite.tex b/Doc/lib/libsite.tex
index 20574ab..2814fe3 100644
--- a/Doc/lib/libsite.tex
+++ b/Doc/lib/libsite.tex
@@ -39,10 +39,10 @@ refers to a directory (rather than a file).  No item is added to
 
 For example, suppose \code{sys.prefix} and \code{sys.exec_prefix} are
 set to \file{/usr/local}.  The Python \version\ library is then
-installed in \file{/usr/local/lib/python1.5} (note that only the first 
-three characters of \code{sys.version} are used to form the path
-name).  Suppose this has a subdirectory
-\file{/usr/local/lib/python1.5/site-packages} with three
+installed in \file{/usr/local/lib/python\var{version}} (where
+\var{version} is the first three characters of \code{sys.version}).
+Suppose this has a subdirectory
+\file{/usr/local/lib/python\var{version}/site-packages} with three
 subsubdirectories, \file{foo}, \file{bar} and \file{spam}, and two
 path configuration files, \file{foo.pth} and \file{bar.pth}.  Assume
 \file{foo.pth} contains the following:
-- 
cgit v0.12

