From 1624a507e6ebd2146272c116f2a66549b9105a6e Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Mon, 9 Feb 1998 22:12:28 +0000
Subject: Oops, missed a \POSIX{} in an index entry.

---
 Doc/lib/libthread.tex | 2 +-
 Doc/libthread.tex     | 2 +-
 2 files changed, 2 insertions(+), 2 deletions(-)

diff --git a/Doc/lib/libthread.tex b/Doc/lib/libthread.tex
index 911c145..ae11823 100644
--- a/Doc/lib/libthread.tex
+++ b/Doc/lib/libthread.tex
@@ -16,7 +16,7 @@ The module is optional.  It is supported on Windows NT and '95, SGI
 IRIX, Solaris 2.x, as well as on systems that have a \POSIX{} thread
 (a.k.a. ``pthread'') implementation.
 \index{pthreads}
-\indexii{threads}{posix}
+\indexii{threads}{\POSIX{}}
 
 It defines the following constant and functions:
 
diff --git a/Doc/libthread.tex b/Doc/libthread.tex
index 911c145..ae11823 100644
--- a/Doc/libthread.tex
+++ b/Doc/libthread.tex
@@ -16,7 +16,7 @@ The module is optional.  It is supported on Windows NT and '95, SGI
 IRIX, Solaris 2.x, as well as on systems that have a \POSIX{} thread
 (a.k.a. ``pthread'') implementation.
 \index{pthreads}
-\indexii{threads}{posix}
+\indexii{threads}{\POSIX{}}
 
 It defines the following constant and functions:
 
-- 
cgit v0.12

