From 102dc417bf14a1e8e0cb4df51acc1c1de48669c5 Mon Sep 17 00:00:00 2001
From: Barry Warsaw <barry@python.org>
Date: Wed, 4 Dec 1996 22:05:42 +0000
Subject: Describe the new Unpacker.get_buffer() method.

---
 Doc/lib/libxdrlib.tex | 4 ++++
 Doc/libxdrlib.tex     | 4 ++++
 2 files changed, 8 insertions(+)

diff --git a/Doc/lib/libxdrlib.tex b/Doc/lib/libxdrlib.tex
index 6b44cb0..e0ed029 100644
--- a/Doc/lib/libxdrlib.tex
+++ b/Doc/lib/libxdrlib.tex
@@ -127,6 +127,10 @@ Sets the data buffer unpack position to \var{position}.  You should be
 careful about using \code{get_position()} and \code{set_position()}.
 \end{funcdesc}
 
+\begin{funcdesc}{get_buffer}{}
+Returns the current unpack data buffer as a string.
+\end{funcdesc}
+
 \begin{funcdesc}{done}{}
 Indicates unpack completion.  Raises an \code{xdrlib.Error} exception
 if all of the data has not been unpacked.
diff --git a/Doc/libxdrlib.tex b/Doc/libxdrlib.tex
index 6b44cb0..e0ed029 100644
--- a/Doc/libxdrlib.tex
+++ b/Doc/libxdrlib.tex
@@ -127,6 +127,10 @@ Sets the data buffer unpack position to \var{position}.  You should be
 careful about using \code{get_position()} and \code{set_position()}.
 \end{funcdesc}
 
+\begin{funcdesc}{get_buffer}{}
+Returns the current unpack data buffer as a string.
+\end{funcdesc}
+
 \begin{funcdesc}{done}{}
 Indicates unpack completion.  Raises an \code{xdrlib.Error} exception
 if all of the data has not been unpacked.
-- 
cgit v0.12

