From e201cbad0b1265a1faa9904a11d5d44186ac9952 Mon Sep 17 00:00:00 2001
From: Thomas Wouters <thomas@python.org>
Date: Sat, 15 Jul 2000 22:13:48 +0000
Subject: Oops, forgot to run autoheader before checking in the _getpty move to
 posixmodule.

---
 config.h.in | 3 +++
 1 file changed, 3 insertions(+)

diff --git a/config.h.in b/config.h.in
index 02e3bd8..32d5e85 100644
--- a/config.h.in
+++ b/config.h.in
@@ -260,6 +260,9 @@
 /* The number of bytes in a void *.  */
 #undef SIZEOF_VOID_P
 
+/* Define if you have the _getpty function.  */
+#undef HAVE__GETPTY
+
 /* Define if you have the alarm function.  */
 #undef HAVE_ALARM
 
-- 
cgit v0.12

