From 78b21cf47a53190381e2d02a67f3e0c2b908b286 Mon Sep 17 00:00:00 2001
From: Guido van Rossum <guido@python.org>
Date: Thu, 8 May 1997 23:21:09 +0000
Subject: Checking in old changes -- no idea why (probably window size).

---
 Doc/ref/ref0.doc | Bin 27647 -> 28671 bytes
 Doc/ref/ref3.doc | Bin 101375 -> 101375 bytes
 Doc/ref/ref4.doc | Bin 45055 -> 45055 bytes
 Doc/ref/ref5.doc | Bin 82943 -> 82943 bytes
 4 files changed, 0 insertions(+), 0 deletions(-)

diff --git a/Doc/ref/ref0.doc b/Doc/ref/ref0.doc
index c70e8c9..ead9726 100644
Binary files a/Doc/ref/ref0.doc and b/Doc/ref/ref0.doc differ
diff --git a/Doc/ref/ref3.doc b/Doc/ref/ref3.doc
index da777b2..668aadb 100644
Binary files a/Doc/ref/ref3.doc and b/Doc/ref/ref3.doc differ
diff --git a/Doc/ref/ref4.doc b/Doc/ref/ref4.doc
index b179775..6875e1d 100644
Binary files a/Doc/ref/ref4.doc and b/Doc/ref/ref4.doc differ
diff --git a/Doc/ref/ref5.doc b/Doc/ref/ref5.doc
index f6f190c..a83a5fb 100644
Binary files a/Doc/ref/ref5.doc and b/Doc/ref/ref5.doc differ
-- 
cgit v0.12

