From 52a6ea7b7da652c19c5175be0c3717c51b33f79c Mon Sep 17 00:00:00 2001
From: "Roger E. Masse" <rmasse@newcnri.cnri.reston.va.us>
Date: Wed, 15 Jan 1997 20:58:55 +0000
Subject: Opps.  Added tests for the last two methods that were missing from 
 the test program: 'grey2rgb' and 'rgb2grey'

---
 Lib/test/test_imageop.py | 12 +++++++++++-
 1 file changed, 11 insertions(+), 1 deletion(-)

diff --git a/Lib/test/test_imageop.py b/Lib/test/test_imageop.py
index 327726d..fc8dadf 100755
--- a/Lib/test/test_imageop.py
+++ b/Lib/test/test_imageop.py
@@ -36,7 +36,7 @@ def main(use_rgbimg=1):
 	print 'tovideo'
     videoimage = imageop.tovideo (image, 4, width, height)
 
-    # Convert an rgb image to an 8 bit rgb (greyscale)
+    # Convert an rgb image to an 8 bit rgb
     if verbose:
 	print 'rgb2rgb8'
     greyimage = imageop.rgb2rgb8(image, width, height)
@@ -46,6 +46,16 @@ def main(use_rgbimg=1):
 	print 'rgb82rgb'
     image = imageop.rgb82rgb(greyimage, width, height)
     
+    # Convert an rgb image to an 8 bit greyscale image
+    if verbose:
+	print 'rgb2grey'
+    greyimage = imageop.rgb2grey(image, width, height)
+
+    # Convert an 8 bit greyscale image to a 24 bit rgb image
+    if verbose:
+	print 'grey2rgb'
+    image = imageop.grey2rgb(greyimage, width, height)
+    
     # Convert a 8-bit deep greyscale image to a 1-bit deep image by
     # tresholding all the pixels. The resulting image is tightly packed
     # and is probably only useful as an argument to mono2grey. 
-- 
cgit v0.12

