From 591bbb157244f7ab484eb4e4b124e828905eb286 Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Tue, 31 Dec 1996 20:51:42 +0000
Subject: (libformatter.tex):  Document the flush() method on the writer.

---
 Doc/lib/libformatter.tex | 4 ++++
 Doc/libformatter.tex     | 4 ++++
 2 files changed, 8 insertions(+)

diff --git a/Doc/lib/libformatter.tex b/Doc/lib/libformatter.tex
index 42783fb..86e6db1 100644
--- a/Doc/lib/libformatter.tex
+++ b/Doc/lib/libformatter.tex
@@ -216,6 +216,10 @@ application.
 
 \renewcommand{\indexsubitem}{(writer object method)}
 
+\begin{funcdesc}{flush}{}
+Flush any buffered output or device control events.
+\end{funcdesc}
+
 \begin{funcdesc}{new_alignment}{align}
 Set the alignment style.  The \code{align} value can be any object,
 but by convention is a string or \code{None}, where \code{None}
diff --git a/Doc/libformatter.tex b/Doc/libformatter.tex
index 42783fb..86e6db1 100644
--- a/Doc/libformatter.tex
+++ b/Doc/libformatter.tex
@@ -216,6 +216,10 @@ application.
 
 \renewcommand{\indexsubitem}{(writer object method)}
 
+\begin{funcdesc}{flush}{}
+Flush any buffered output or device control events.
+\end{funcdesc}
+
 \begin{funcdesc}{new_alignment}{align}
 Set the alignment style.  The \code{align} value can be any object,
 but by convention is a string or \code{None}, where \code{None}
-- 
cgit v0.12

