From 3e1e274d0b16bab5fd27a7d418863be8d3093466 Mon Sep 17 00:00:00 2001
From: Guido van Rossum <guido@python.org>
Date: Tue, 25 Nov 1997 00:43:34 +0000
Subject: Don't use $math$ mode to typeset a simple '>' sign.  Use \code, not
 \samp.

---
 Doc/lib/libcommands.tex | 2 +-
 Doc/libcommands.tex     | 2 +-
 2 files changed, 2 insertions(+), 2 deletions(-)

diff --git a/Doc/lib/libcommands.tex b/Doc/lib/libcommands.tex
index fe6f929..0bc2a2b 100644
--- a/Doc/lib/libcommands.tex
+++ b/Doc/lib/libcommands.tex
@@ -15,7 +15,7 @@ The \code{commands} module defines the following functions:
 \begin{funcdesc}{getstatusoutput}{cmd}
 Execute the string \var{cmd} in a shell with \code{os.popen()} and return
 a 2-tuple (status, output).  \var{cmd} is actually run as
-\samp{\{\ cmd \} ; 2$>$\$1}, so that the returned output will contain output
+\code{\{ cmd ; \} 2>\&1}, so that the returned output will contain output
 or error messages. A trailing newline is stripped from the output.
 The exit status for the  command can be interpreted according to the
 rules for the \C{} function \code{wait()}.  
diff --git a/Doc/libcommands.tex b/Doc/libcommands.tex
index fe6f929..0bc2a2b 100644
--- a/Doc/libcommands.tex
+++ b/Doc/libcommands.tex
@@ -15,7 +15,7 @@ The \code{commands} module defines the following functions:
 \begin{funcdesc}{getstatusoutput}{cmd}
 Execute the string \var{cmd} in a shell with \code{os.popen()} and return
 a 2-tuple (status, output).  \var{cmd} is actually run as
-\samp{\{\ cmd \} ; 2$>$\$1}, so that the returned output will contain output
+\code{\{ cmd ; \} 2>\&1}, so that the returned output will contain output
 or error messages. A trailing newline is stripped from the output.
 The exit status for the  command can be interpreted according to the
 rules for the \C{} function \code{wait()}.  
-- 
cgit v0.12

