From 6a79be8db82dd19ba69dcac5f4b10225db5f4064 Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Fri, 3 Apr 1998 03:47:03 +0000
Subject: Capitalize "Python" for consistency.

Add an index entry.
---
 Doc/lib/libcgi.tex | 7 ++++---
 Doc/libcgi.tex     | 7 ++++---
 2 files changed, 8 insertions(+), 6 deletions(-)

diff --git a/Doc/lib/libcgi.tex b/Doc/lib/libcgi.tex
index 55abd10..4b01862 100644
--- a/Doc/lib/libcgi.tex
+++ b/Doc/lib/libcgi.tex
@@ -1,4 +1,4 @@
-\section{Standard Module \sectcode{cgi}}
+\section{Standard Module \module{cgi}}
 \label{module-cgi}
 \stmodindex{cgi}
 \indexii{WWW}{server}
@@ -8,7 +8,8 @@
 \index{URL}
 
 
-Support module for CGI (Common Gateway Interface) scripts.
+Support module for CGI (Common Gateway Interface) scripts.%
+\index{Common Gateway Interface}
 
 This module defines a number of utilities for use by CGI scripts
 written in Python.
@@ -316,7 +317,7 @@ Unfortunately, a CGI script will generally not run when you try it
 from the command line, and a script that works perfectly from the
 command line may fail mysteriously when run from the server.  There's
 one reason why you should still test your script from the command
-line: if it contains a syntax error, the python interpreter won't
+line: if it contains a syntax error, the Python interpreter won't
 execute it at all, and the HTTP server will most likely send a cryptic
 error to the client.
 
diff --git a/Doc/libcgi.tex b/Doc/libcgi.tex
index 55abd10..4b01862 100644
--- a/Doc/libcgi.tex
+++ b/Doc/libcgi.tex
@@ -1,4 +1,4 @@
-\section{Standard Module \sectcode{cgi}}
+\section{Standard Module \module{cgi}}
 \label{module-cgi}
 \stmodindex{cgi}
 \indexii{WWW}{server}
@@ -8,7 +8,8 @@
 \index{URL}
 
 
-Support module for CGI (Common Gateway Interface) scripts.
+Support module for CGI (Common Gateway Interface) scripts.%
+\index{Common Gateway Interface}
 
 This module defines a number of utilities for use by CGI scripts
 written in Python.
@@ -316,7 +317,7 @@ Unfortunately, a CGI script will generally not run when you try it
 from the command line, and a script that works perfectly from the
 command line may fail mysteriously when run from the server.  There's
 one reason why you should still test your script from the command
-line: if it contains a syntax error, the python interpreter won't
+line: if it contains a syntax error, the Python interpreter won't
 execute it at all, and the HTTP server will most likely send a cryptic
 error to the client.
 
-- 
cgit v0.12

