From 7730cc067ff7eff237f8e6ca63b62595d45fbf36 Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Sun, 30 Nov 1997 05:23:47 +0000
Subject: Updated \indexsubitem; functions had been indexed for the wrong
 module.

---
 Doc/lib/librand.tex | 2 ++
 Doc/librand.tex     | 2 ++
 2 files changed, 4 insertions(+)

diff --git a/Doc/lib/librand.tex b/Doc/lib/librand.tex
index 0660566..4ba5f17 100644
--- a/Doc/lib/librand.tex
+++ b/Doc/lib/librand.tex
@@ -8,6 +8,8 @@ given library's implementation.  While still supported for
 compatibility, the \code{rand} module is now considered obsolete; if
 possible, use the \code{whrandom} module instead.
 
+\renewcommand{\indexsubitem}{(in module rand)}
+
 \begin{funcdesc}{choice}{seq}
 Returns a random element from the sequence \var{seq}.
 \end{funcdesc}
diff --git a/Doc/librand.tex b/Doc/librand.tex
index 0660566..4ba5f17 100644
--- a/Doc/librand.tex
+++ b/Doc/librand.tex
@@ -8,6 +8,8 @@ given library's implementation.  While still supported for
 compatibility, the \code{rand} module is now considered obsolete; if
 possible, use the \code{whrandom} module instead.
 
+\renewcommand{\indexsubitem}{(in module rand)}
+
 \begin{funcdesc}{choice}{seq}
 Returns a random element from the sequence \var{seq}.
 \end{funcdesc}
-- 
cgit v0.12

