From e4a252ef88bd788db6a0712b088ff128aa33d15d Mon Sep 17 00:00:00 2001
From: Barry Warsaw <barry@python.org>
Date: Tue, 10 Dec 1996 23:19:14 +0000
Subject: Directory for test output files: Output => output

---
 Lib/test/autotest.py | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

diff --git a/Lib/test/autotest.py b/Lib/test/autotest.py
index 0d2fa8e..4b15c26 100644
--- a/Lib/test/autotest.py
+++ b/Lib/test/autotest.py
@@ -10,7 +10,7 @@ run.  If a difference is noticed it raises an exception; if all is
 well, it prints nothing except 'All tests OK.' at the very end.
 
 The output from a previous run is supposed to be contained in separate
-files (one per test) in the `Output' subdirectory somewhere on the
+files (one per test) in the `output' subdirectory somewhere on the
 search path for modules (sys.path, initialized from $PYTHONPATH plus
 some default places).
 
@@ -128,7 +128,7 @@ def main():
 			warn = 1
 
 	# find the output directory
-	outdir = findfile('Output')
+	outdir = findfile('output')
 	if args:
 	    tests = args
 	else:
-- 
cgit v0.12

