From b92dce38e7834dcde4f450c89da1c10f81a6d1a0 Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Wed, 25 Feb 1998 15:40:22 +0000
Subject: PyFile_FromFile() description:  make sure the closing brace for the
 arguments 	comes after the arguments are complete.

---
 Doc/api.tex     | 2 +-
 Doc/api/api.tex | 2 +-
 2 files changed, 2 insertions(+), 2 deletions(-)

diff --git a/Doc/api.tex b/Doc/api.tex
index ade73cf..a0e6bc4 100644
--- a/Doc/api.tex
+++ b/Doc/api.tex
@@ -2169,7 +2169,7 @@ specified in \var{name} with the mode specified in \var{mode}.
 \end{cfuncdesc}
 
 \begin{cfuncdesc}{PyObject *}{PyFile_FromFile}{FILE *fp,
-              char *name, char *mode, int (*close})
+              char *name, char *mode, int (*close)}
 Creates a new \code{PyFileObject} from the already-open \var{fp}.
 The function \var{close} will be called when the file should be
 closed.
diff --git a/Doc/api/api.tex b/Doc/api/api.tex
index ade73cf..a0e6bc4 100644
--- a/Doc/api/api.tex
+++ b/Doc/api/api.tex
@@ -2169,7 +2169,7 @@ specified in \var{name} with the mode specified in \var{mode}.
 \end{cfuncdesc}
 
 \begin{cfuncdesc}{PyObject *}{PyFile_FromFile}{FILE *fp,
-              char *name, char *mode, int (*close})
+              char *name, char *mode, int (*close)}
 Creates a new \code{PyFileObject} from the already-open \var{fp}.
 The function \var{close} will be called when the file should be
 closed.
-- 
cgit v0.12

