From 7a24c374444e4ad8994cf5147964dbfcff441955 Mon Sep 17 00:00:00 2001
From: Guido van Rossum <guido@python.org>
Date: Fri, 9 May 1997 02:41:10 +0000
Subject: Move WANT_SIGFPE_HANDLER.

---
 acconfig.h | 6 +++---
 1 file changed, 3 insertions(+), 3 deletions(-)

diff --git a/acconfig.h b/acconfig.h
index 5c6d301..14bf222 100644
--- a/acconfig.h
+++ b/acconfig.h
@@ -60,6 +60,9 @@
 /* Define to empty if the keyword does not work.  */
 #undef volatile
 
+/* Define if you want SIGFPE handled (see Include/pyfpe.h). */
+#undef WANT_SIGFPE_HANDLER
+
 /* Define if you want to use SGI (IRIX 4) dynamic linking.
    This requires the "dl" library by Jack Jansen,
    ftp://ftp.cwi.nl/pub/dynload/dl-1.6.tar.Z.
@@ -84,8 +87,5 @@
 /* Define if you want to use the GNU readline library */
 #undef WITH_READLINE
 
-/* Define if you want SIGFPE handled (see Include/pyfpe.h). */
-#undef WANT_SIGFPE_HANDLER
-
 
 /* Leave that blank line there-- autoheader needs it! */
-- 
cgit v0.12

