From 3808045d00f7296b71ca598f9f4156406bc365eb Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Thu, 1 Nov 2001 19:48:01 +0000
Subject: Correct misspelling of "separate" in two places. This closes SF bug
 #476898.

---
 Doc/mac/using.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

diff --git a/Doc/mac/using.tex b/Doc/mac/using.tex
index 0a077b9..47df26e 100644
--- a/Doc/mac/using.tex
+++ b/Doc/mac/using.tex
@@ -207,7 +207,7 @@ a class browser, a graphical debugger, and more.
 Use this window like you would the \program{PythonInterpreter}, except
 that you cannot use the ``Drag and drop'' method above. Instead,
 dropping a script onto the \program{Python IDE} icon will open the
-file in a seperate script window (which you can then execute manually
+file in a separate script window (which you can then execute manually
 -- see section \ref{IDEexecution}).
 
 
@@ -262,7 +262,7 @@ saving it as an ``applet'' (by selecting ``Save as applet'' from the
 files or folders onto it, to pass them to the applet the way
 command-line users would type them onto the command-line to pass them
 as arguments to the script. However, you should make sure to save the
-applet as a seperate file, do not overwrite the script you are
+applet as a separate file, do not overwrite the script you are
 writing, because you will not be able to edit it again.
 
 Accessing the items passed to the applet via ``drag-and-drop'' is done
-- 
cgit v0.12

