From 92a6ed9940c59678e5e9e9bab18449da66ba2fcc Mon Sep 17 00:00:00 2001
From: Barry Warsaw <barry@python.org>
Date: Fri, 7 Aug 1998 16:33:51 +0000
Subject: Minor refilling of a paragraph...

---
 Doc/ref/ref3.tex | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

diff --git a/Doc/ref/ref3.tex b/Doc/ref/ref3.tex
index 28d9e0e..4ca8d69 100644
--- a/Doc/ref/ref3.tex
+++ b/Doc/ref/ref3.tex
@@ -35,8 +35,8 @@ lists are mutable.
 
 Objects are never explicitly destroyed; however, when they become
 unreachable they may be garbage-collected.  An implementation is
-allowed to postpone garbage collection or omit it altogether --- it is a
-matter of implementation quality how garbage collection is
+allowed to postpone garbage collection or omit it altogether --- it is
+a matter of implementation quality how garbage collection is
 implemented, as long as no objects are collected that are still
 reachable.  (Implementation note: the current implementation uses a
 reference-counting scheme which collects most objects as soon as they
-- 
cgit v0.12

