From 889f53d4e0c3b701d5de0892a0ab8caabeb689b8 Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Fri, 24 Jul 1998 13:54:29 +0000
Subject: Reduce the number of levels in the Table of Contents by one, mostly
 for the Python Library Reference.  The other manuals do not suffer.

This does not affect HOWTO documents.
---
 Doc/texinputs/manual.cls | 1 +
 1 file changed, 1 insertion(+)

diff --git a/Doc/texinputs/manual.cls b/Doc/texinputs/manual.cls
index fe7e3ef..21e74c9 100644
--- a/Doc/texinputs/manual.cls
+++ b/Doc/texinputs/manual.cls
@@ -132,6 +132,7 @@
 %
 \renewcommand*\l@section{\@dottedtocline{1}{1.5em}{2.6em}}
 \renewcommand*\l@subsection{\@dottedtocline{2}{4.1em}{3.5em}}
+\setcounter{tocdepth}{1}
 
 
 % Fix the theindex environment to add an entry to the Table of
-- 
cgit v0.12

