From b4929a794edba7e47a71c27a67e00c47d468a99b Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Sat, 25 Apr 1998 04:11:27 +0000
Subject: Paper size / font size configuration file.

This is separated so I can build A4 and US Letter sizes without having to
edit files.

Anyone who downloads the source package can also simply edit this file,
which is a lot shorter than the manual.cls file, and easier to find the
appropriate line.
---
 Doc/texinputs/pypaper.sty | 6 ++++++
 1 file changed, 6 insertions(+)
 create mode 100644 Doc/texinputs/pypaper.sty

diff --git a/Doc/texinputs/pypaper.sty b/Doc/texinputs/pypaper.sty
new file mode 100644
index 0000000..5a61c87
--- /dev/null
+++ b/Doc/texinputs/pypaper.sty
@@ -0,0 +1,6 @@
+%
+%  Change this to say a4paper instead of letterpaper if you want A4.  These
+%  are the latex defaults.
+%
+\newcommand{\py@paper}{letterpaper}
+\newcommand{\py@ptsize}{10pt}
-- 
cgit v0.12

