From 505c49199a59a265ba95daa703470ea606a96486 Mon Sep 17 00:00:00 2001
From: Fred Drake <fdrake@acm.org>
Date: Tue, 27 Apr 1999 18:05:06 +0000
Subject: Added "See also" reference to PyOpenGL.

---
 Doc/lib/libgl.tex | 18 ++++++++++++++----
 1 file changed, 14 insertions(+), 4 deletions(-)

diff --git a/Doc/lib/libgl.tex b/Doc/lib/libgl.tex
index 0c0f578..615504a 100644
--- a/Doc/lib/libgl.tex
+++ b/Doc/lib/libgl.tex
@@ -48,13 +48,13 @@ For example, the C call
 \begin{verbatim}
 lmdef(deftype, index, np, props)
 \end{verbatim}
-%
+
 is translated to Python as
 
 \begin{verbatim}
 lmdef(deftype, index, props)
 \end{verbatim}
-%
+
 \item
 Output arguments are omitted from the argument list; they are
 transmitted as function return values instead.
@@ -67,13 +67,13 @@ Examples: the C call
 \begin{verbatim}
 getmcolor(i, &red, &green, &blue)
 \end{verbatim}
-%
+
 is translated to Python as
 
 \begin{verbatim}
 red, green, blue = getmcolor(i)
 \end{verbatim}
-%
+
 \end{itemize}
 
 The following functions are non-standard or have special argument
@@ -188,6 +188,16 @@ main()
 \end{verbatim}
 
 
+\begin{seealso}
+  \seetext{An interface to OpenGL\index{OpenGL} is also available; see
+           information about David Ascher's\index{Ascher, David}
+           \strong{PyOpenGL}\index{PyOpenGL} online at
+           \url{http://starship.python.net/crew/da/PyOpenGL/}.  This may
+           be a better option if support for SGI hardware from before about
+           1996 is not required.}
+\end{seealso}
+
+
 \section{\module{DEVICE} ---
          Constants used with the \module{gl} module}
 
-- 
cgit v0.12

