From bc41957d2b58dfaae24e8a996e3e7c4fe3b475dd Mon Sep 17 00:00:00 2001
From: "Eric S. Raymond" <esr@thyrsus.com>
Date: Tue, 17 Apr 2001 17:20:19 +0000
Subject: Unused variable (caught by PyChecker) removed.

---
 Lib/shlex.py | 1 -
 1 file changed, 1 deletion(-)

diff --git a/Lib/shlex.py b/Lib/shlex.py
index 97b8f2e..e50b9ad 100644
--- a/Lib/shlex.py
+++ b/Lib/shlex.py
@@ -96,7 +96,6 @@ class shlex:
 
     def read_token(self):
         "Read a token from the input stream (no pushback or inclusions)"
-        tok = ''
         while 1:
             nextchar = self.instream.read(1)
             if nextchar == '\n':
-- 
cgit v0.12

