From 0ceb9b160335108a0235b68570b9d64df972070f Mon Sep 17 00:00:00 2001
From: "Andrew M. Kuchling" <amk@amk.ca>
Date: Mon, 21 Jul 2003 12:49:46 +0000
Subject: Change \code to \verb, because TeX merges the two dashes into a
 hyphen, resulting in the output '-list-classifiers', not the correct
 '--list-classifiers'.  I've verified that the line is now correct in the DVI,
 PDF, HTML, and ASCII versions.

---
 Doc/whatsnew/whatsnew23.tex | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/Doc/whatsnew/whatsnew23.tex b/Doc/whatsnew/whatsnew23.tex
index 722a7a6..7e3818f 100644
--- a/Doc/whatsnew/whatsnew23.tex
+++ b/Doc/whatsnew/whatsnew23.tex
@@ -757,7 +757,7 @@ core.setup(**kw)
 \end{verbatim}
 
 The full list of classifiers can be obtained by running 
-\code{python setup.py register --list-classifiers}.
+\verb|python setup.py register --list-classifiers|.
 
 \begin{seealso}
 
-- 
cgit v0.12

