From d3b8f98696b905367da3975f73b482bac380b51c Mon Sep 17 00:00:00 2001
From: Jelle Zijlstra <jelle.zijlstra@gmail.com>
Date: Sat, 11 Mar 2017 09:34:55 -0800
Subject: tempfile.rst: Fix some typos (GH-610)

---
 Doc/library/tempfile.rst | 4 ++--
 1 file changed, 2 insertions(+), 2 deletions(-)

diff --git a/Doc/library/tempfile.rst b/Doc/library/tempfile.rst
index 665261f..c59aca1 100644
--- a/Doc/library/tempfile.rst
+++ b/Doc/library/tempfile.rst
@@ -245,12 +245,12 @@ The module uses a global variable to store the name of the directory
 used for temporary files returned by :func:`gettempdir`.  It can be
 set directly to override the selection process, but this is discouraged.
 All functions in this module take a *dir* argument which can be used
-to specify the directory and this is the recommend approach.
+to specify the directory and this is the recommended approach.
 
 .. data:: tempdir
 
    When set to a value other than ``None``, this variable defines the
-   default value for the *dir* argument to all the functions defined in this
+   default value for the *dir* argument to the functions defined in this
    module.
 
    If ``tempdir`` is unset or ``None`` at any call to any of the above
-- 
cgit v0.12

