From ee130b72f897dc90b51b2ff78df1eedfde483f5e Mon Sep 17 00:00:00 2001
From: Thomas Heller <theller@ctypes.org>
Date: Fri, 16 May 2008 20:19:07 +0000
Subject: Very simple test for ctypes.util.find_library on Windows.

---
 Lib/ctypes/test/test_loading.py | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

diff --git a/Lib/ctypes/test/test_loading.py b/Lib/ctypes/test/test_loading.py
index 4b95029..712b650 100644
--- a/Lib/ctypes/test/test_loading.py
+++ b/Lib/ctypes/test/test_loading.py
@@ -6,7 +6,7 @@ from ctypes.test import is_resource_enabled
 
 libc_name = None
 if os.name == "nt":
-    libc_name = "msvcrt"
+    libc_name = find_library("c")
 elif os.name == "ce":
     libc_name = "coredll"
 elif sys.platform == "cygwin":
@@ -43,6 +43,7 @@ class LoaderTest(unittest.TestCase):
 
     if os.name in ("nt", "ce"):
         def test_load_library(self):
+            self.failIf(libc_name is None)
             if is_resource_enabled("printing"):
                 print find_library("kernel32")
                 print find_library("user32")
-- 
cgit v0.12

