From a31e084136a52adc11c56fc971a7802c565448b7 Mon Sep 17 00:00:00 2001
From: Guido van Rossum <guido@python.org>
Date: Tue, 22 Oct 1996 17:57:23 +0000
Subject: It turns out that VC1.5 does not necessarily define _WINDOWS.

---
 PC/config.h | 2 --
 1 file changed, 2 deletions(-)

diff --git a/PC/config.h b/PC/config.h
index d360ae4..0247cef 100644
--- a/PC/config.h
+++ b/PC/config.h
@@ -93,10 +93,8 @@ typedef int pid_t;
 #if defined(_MSC_VER) && _MSC_VER <= 850
 /* Start of defines for 16-bit Windows using VC++ 1.5 */
 #define COMPILER "[MSC 16-bit]"
-#ifdef _WINDOWS
 #define MS_WIN16
 #define MS_WINDOWS
-#endif
 #define PYTHONPATH ".;.\\lib;.\\lib\\win;.\\lib\\dos_8x3"
 #define IMPORT_8x3_NAMES
 typedef int pid_t;
-- 
cgit v0.12

