From fffc25da8388b4bcea4c81e1b3dff4e4f4e85b0a Mon Sep 17 00:00:00 2001
From: Georg Brandl <georg@python.org>
Date: Sun, 28 Oct 2012 07:59:42 +0100
Subject: #8040: fix jQuery incompatibility

---
 Doc/tools/sphinxext/static/version_switch.js | 18 ++++++++++--------
 1 file changed, 10 insertions(+), 8 deletions(-)

diff --git a/Doc/tools/sphinxext/static/version_switch.js b/Doc/tools/sphinxext/static/version_switch.js
index 363bebf..cc7be1c 100644
--- a/Doc/tools/sphinxext/static/version_switch.js
+++ b/Doc/tools/sphinxext/static/version_switch.js
@@ -43,19 +43,21 @@
 
     if (new_url != url) {
       // check beforehand if url exists, else redirect to version's start page
-      $.get(new_url, function() {
-        window.location.href = new_url;
-      }).error(function() {
-        window.location.href = 'http://docs.python.org/' + selected;
+      $.ajax({
+        url: new_url,
+        success: function() {
+           window.location.href = new_url;
+        },
+        error: function() {
+           window.location.href = 'http://docs.python.org/' + selected;
+        }
       });
     }
   }
 
   $(document).ready(function() {
-    var version = DOCUMENTATION_OPTIONS.VERSION.split('.'),
-        release = DOCUMENTATION_OPTIONS.RELEASE || DOCUMENTATION_OPTIONS.VERSION;
-
-    version = version[0] + '.' + version[1];
+    var release = DOCUMENTATION_OPTIONS.VERSION;
+    var version = release.substr(0, 3);
     var select = build_select(version, release);
 
     $('.version_switcher_placeholder').html(select);
-- 
cgit v0.12

