From 110ee34e4179727d2c8bf56cb655a89c561c30e0 Mon Sep 17 00:00:00 2001
From: Antoine Pitrou <solipsis@pitrou.net>
Date: Sat, 23 Jun 2012 22:55:58 +0200
Subject: Lower test-skipping threshold in test_reprlib

---
 Lib/test/test_reprlib.py | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

diff --git a/Lib/test/test_reprlib.py b/Lib/test/test_reprlib.py
index aca1d5b..589ecdd 100644
--- a/Lib/test/test_reprlib.py
+++ b/Lib/test/test_reprlib.py
@@ -242,7 +242,7 @@ class LongReprTest(unittest.TestCase):
         # a path separator + `module_name` + ".py"
         source_path_len += len(module_name) + 1 + len(".py")
         cached_path_len = source_path_len + len(imp.cache_from_source("x.py")) - len("x.py")
-        if os.name == 'nt' and cached_path_len >= 259:
+        if os.name == 'nt' and cached_path_len >= 258:
             # Under Windows, the max path len is 260 including C's terminating
             # NUL character.
             # (see http://msdn.microsoft.com/en-us/library/windows/desktop/aa365247%28v=vs.85%29.aspx#maxpath)
-- 
cgit v0.12

