From 60adf9595592a84c1108ab984d81397c0a5c613d Mon Sep 17 00:00:00 2001
From: Ezio Melotti <ezio.melotti@gmail.com>
Date: Fri, 15 Apr 2011 07:37:00 +0300
Subject: #4783: document that is not possible to use json.dump twice on the
 same stream.

---
 Doc/library/json.rst | 5 +++++
 1 file changed, 5 insertions(+)

diff --git a/Doc/library/json.rst b/Doc/library/json.rst
index 2bf242f..0b42012 100644
--- a/Doc/library/json.rst
+++ b/Doc/library/json.rst
@@ -156,6 +156,11 @@ Basic Usage
    Serialize *obj* to a JSON formatted :class:`str`.  The arguments have the
    same meaning as in :func:`dump`.
 
+   .. note::
+
+      Unlike :mod:`pickle` and :mod:`marshal`, JSON is not a framed protocol so
+      trying to serialize more objects with repeated calls to :func:`dump` and
+      the same *fp* will result in an invalid JSON file.
 
 .. function:: load(fp, cls=None, object_hook=None, parse_float=None, parse_int=None, parse_constant=None, object_pairs_hook=None, **kw)
 
-- 
cgit v0.12

