From 3f45f5da8eb052f1b54d37086c67b7094f35b67b Mon Sep 17 00:00:00 2001
From: Zackery Spytz <zspytz@gmail.com>
Date: Sat, 9 Jun 2018 11:09:45 -0600
Subject: bpo-33375: Fix GCC warning in Python/_warnings.c (GH-7556)

_Py_IDENTIFIER(argv) is now unused.
---
 Python/_warnings.c | 1 -
 1 file changed, 1 deletion(-)

diff --git a/Python/_warnings.c b/Python/_warnings.c
index 9c7a6e1..d6614b2 100644
--- a/Python/_warnings.c
+++ b/Python/_warnings.c
@@ -9,7 +9,6 @@ PyDoc_STRVAR(warnings__doc__,
 MODULE_NAME " provides basic warning filtering support.\n"
 "It is a helper module to speed up interpreter start-up.");
 
-_Py_IDENTIFIER(argv);
 _Py_IDENTIFIER(stderr);
 #ifndef Py_DEBUG
 _Py_IDENTIFIER(default);
-- 
cgit v0.12

