From b613a3d4587bd93ea66ed0516372b0b7cd9450eb Mon Sep 17 00:00:00 2001
From: Georg Brandl <georg@python.org>
Date: Tue, 1 May 2012 09:57:34 +0200
Subject: Disable test_13183 temporarily on Windows for 3.3a3 release.

---
 Lib/test/test_pdb.py | 3 ++-
 1 file changed, 2 insertions(+), 1 deletion(-)

diff --git a/Lib/test/test_pdb.py b/Lib/test/test_pdb.py
index 1570873..fc23e14 100644
--- a/Lib/test/test_pdb.py
+++ b/Lib/test/test_pdb.py
@@ -1,5 +1,5 @@
 # A test suite for pdb; not very comprehensive at the moment.
-
+import os
 import imp
 import pdb
 import sys
@@ -631,6 +631,7 @@ class PdbTestCase(unittest.TestCase):
         self.assertNotIn(b'SyntaxError', stdout,
                          "Got a syntax error running test script under PDB")
 
+    @unittest.skipIf(os.name == 'nt', "temporarily disabled on Windows")
     def test_issue13183(self):
         script = """
             from bar import bar
-- 
cgit v0.12

