<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">\section{\module{getopt} ---
         Parser for command line options.}
\declaremodule{standard}{getopt}

\modulesynopsis{Parser for command line options.}


This module helps scripts to parse the command line arguments in
\code{sys.argv}.
It supports the same conventions as the \UNIX{} \cfunction{getopt()}
function (including the special meanings of arguments of the form
`\code{-}' and `\code{-}\code{-}').
% That's to fool latex2html into leaving the two hyphens alone!
Long options similar to those supported by
GNU software may be used as well via an optional third argument.
This module provides a single function and an exception:

\begin{funcdesc}{getopt}{args, options\optional{, long_options}}
Parses command line options and parameter list.  \var{args} is the
argument list to be parsed, without the leading reference to the
running program. Typically, this means \samp{sys.argv[1:]}.
\var{options} is the string of option letters that the script wants to
recognize, with options that require an argument followed by a colon
(i.e., the same format that \UNIX{} \cfunction{getopt()} uses).  If
specified, \var{long_options} is a list of strings with the names of
the long options which should be supported.  The leading
\code{'-}\code{-'} characters should not be included in the option
name.  Options which require an argument should be followed by an
equal sign (\code{'='}).

The return value consists of two elements: the first is a list of
\code{(\var{option}, \var{value})} pairs; the second is the list of
program arguments left after the option list was stripped (this is a
trailing slice of the first argument).
Each option-and-value pair returned has the option as its first
element, prefixed with a hyphen (e.g., \code{'-x'}), and the option
argument as its second element, or an empty string if the option has
no argument.
The options occur in the list in the same order in which they were
found, thus allowing multiple occurrences.  Long and short options may
be mixed.
\end{funcdesc}

\begin{excdesc}{GetoptError}
This is raised when an unrecognized option is found in the argument
list or when an option requiring an argument is given none.
The argument to the exception is a string indicating the cause of the
error.  For long options, an argument given to an option which does
not require one will also cause this exception to be raised.  The
attributes \member{msg} and \member{opt} give the error message and
related option; if there is no specific option to which the exception
relates, \member{opt} is an empty string.
\end{excdesc}

\begin{excdesc}{error}
Alias for \exception{GetoptError}; for backward compatibility.
\end{excdesc}


An example using only \UNIX{} style options:

\begin{verbatim}
&gt;&gt;&gt; import getopt, string
&gt;&gt;&gt; args = string.split('-a -b -cfoo -d bar a1 a2')
&gt;&gt;&gt; args
['-a', '-b', '-cfoo', '-d', 'bar', 'a1', 'a2']
&gt;&gt;&gt; optlist, args = getopt.getopt(args, 'abc:d:')
&gt;&gt;&gt; optlist
[('-a', ''), ('-b', ''), ('-c', 'foo'), ('-d', 'bar')]
&gt;&gt;&gt; args
['a1', 'a2']
&gt;&gt;&gt; 
\end{verbatim}

Using long option names is equally easy:

\begin{verbatim}
&gt;&gt;&gt; s = '--condition=foo --testing --output-file abc.def -x a1 a2'
&gt;&gt;&gt; args = string.split(s)
&gt;&gt;&gt; args
['--condition=foo', '--testing', '--output-file', 'abc.def', '-x', 'a1', 'a2']
&gt;&gt;&gt; optlist, args = getopt.getopt(args, 'x', [
...     'condition=', 'output-file=', 'testing'])
&gt;&gt;&gt; optlist
[('--condition', 'foo'), ('--testing', ''), ('--output-file', 'abc.def'), ('-x',
 '')]
&gt;&gt;&gt; args
['a1', 'a2']
&gt;&gt;&gt; 
\end{verbatim}
</pre></body></html>