<html><head><meta name="color-scheme" content="light dark"></head><body><pre style="word-wrap: break-word; white-space: pre-wrap;">% Template for library sections.
% Replace text in ALL CAPS by your own text.
% Comments starting with %** give additional directions.

%** Choose one of the following two section headings:
\section{Built-in module {\tt YOUR-MODULE-NAME}} % If written in C
\section{Standard module {\tt YOUR-MODULE-NAME}} % If written in Python

PUT A SHORT INTRODUCTION AND DESCRIPTION OF THE MODULE HERE.

%** change this sentence to taste:
The module defines the following variables and functions:

\begin{description}

\renewcommand{\indexsubitem}{(in module YOUR-MODULE-NAME)}


%** You can mix exceptions, variables and functions below; often it is a
%** good idea to alphabetize them all.


%** repeat the following for each exception:
\excitem{NAME}
DESCRIPTION OF THE EXCEPTION GOES HERE.


%** repeat the following for each variable (or constant):
\dataitem{NAME}
DESCRIPTION OF THE VARIABLE/CONSTANT GOES HERE.


%** repeat the following for each function:
\funcitem{NAME}{PARAMETERS} % Don't include the parentheses
DESCRIPTION OF THE FUNCTION GOES HERE.


\end{description}

ADDITIONAL HINTS FOR USING THE MODULE MAY GO HERE.
</pre></body></html>